Title: The Second Bank of the United States -- Video
Course: Kelly's Copy & Export Course > Section: The Second Bank of the United States -- The Federal Reserve and You

Watch the video below and then click "next" to take the quiz.

After the First Bank closed in 1811, the U.S. had no national bank until the Second Bank opened in 1817. Why did this bank spark so much debate?